The 1000 Brightest HIPASS Galaxies: H i Properties

B. S. Koribalski^1 et al.

Electronic Figure 1

H i spectra of all 1000 members of the HIPASS Bright Galaxy Catalog (BGC). The HIPASS name together with the most likely optical identification (in brackets) is given at the top of each spectrum. Marked are also the measured H i peak flux density as well as the 50% and 20% velocity widths. The vertical lines indicate the velocity range used for the first order baseline fit (outside) and the H i line emission analysis (inside).

1Australia Telescope National Facility, CSIRO, P.O. Box 76, Epping, NSW 1710, Australia.

Fig. 1.— .